\begin{frame}
\frametitle{Topic 12: Application: Interpretable Device Failure}

\Large \textbf{Interpretable, Multidimensional, Multimodal Anomaly Detection with Negative Sampling for Detection of Device Failure} (Sipple et al, 2020)\\
\LARGE \textbf{Supervisor:} Bin Li (bin.li@tu-dortmund.de)\\

    %\begin{center}
        %\includegraphics[height=3cm]{illustrations/bin2.png}
    %\end{center}

    \begin{columns}
        \begin{column}{.675\textwidth}
            \begin{center}
                \includegraphics[height=3cm]{illustrations/bin2.png}
            \end{center}
        \end{column}
        \begin{column}{.275\textwidth}
            \begin{itemize}
                \item real world data is messy
                \item detect IOT devices that fail
            \end{itemize}

        \end{column}
    \end{columns}



\end{frame}
