\begin{frame}
\frametitle{Topic 11: Application: Interpretable Device Failure}

\Large \textbf{Interpretable, Multidimensional, Multimodal Anomaly Detection with Negative Sampling for Detection of Device Failure} (Sipple et al, 2020)\\
\LARGE \textbf{Supervisor:} Bin Li (bin.li@tu-dortmund.de)\\

    \begin{center}
\includegraphics[height=3cm]{illustrations/bin2.png}
\includegraphics[height=3cm]{clock/output11.pdf}
    \end{center}


\end{frame}
